What are the different drawer slide types?

A drawer slide is a hardware fitting that allows a drawer to move into and out of the furniture in which it’s installed. Each drawer has a pair of slides fixed to it. When you open a drawer, it will glide along these slides. 6 different drawer slide types are available, namely:   Ball bearing …

What are the different drawer slide types? Read More »

The post What are the different drawer slide types? appeared first on Building And Interiors.