What is the standard size of a kitchen cabinet?

Depending on your design requirements, base cabinets may feature a single door, double doors, a string of drawers, or a mix of both. A standard base kitchen cabinet size should be 34.5 inches tall without the countertop and 36 inches in height with it.   Image Source: houseplanshelper.com   You can choose between heights of …

What is the standard size of a kitchen cabinet? Read More »

The post What is the standard size of a kitchen cabinet? appeared first on Building And Interiors.